This is the file which will be sent in reply to a REQDIR request which has
been answered correctly.  It will follow the list of files or directories.

This file should provide help to the user to enable him to correctly
download one of the files specified above.  It can also inform him about
how to have his reply returned to another BBS other than where he inputs
his initial request.

If this file is not present, a default response contained within the
program REQDIR.EXE will be sent.

VERY IMPORTANT
==============
Ensure that this file does not contain any embedded WP control codes or
end with a CONTROL Z.


